' CONFIGURATION SHEET |

Serial Number 010746

System Board DFI 486 CCV (486/DX2-66)

Cache RAM 256k

System RAM 8mb (8 X 1mb*9 SIMMS)

Hard Disk Model Seagate ST5660A (540mb) Type No. 47

Operating System MS DOS V6.22

Diskette Drive(s) Panasonic 1.44mb Diskette Drive

Controller Cards CSA-6210/Kx (VLB)

Other

OTHER DETAILS

The Hard Disk is Self Parking

The Hard Disk MUST NOT be Low Level Formatted

Hard Disk CMOS Values Cyl Heads

1057 16

FINAL TEST

VIRUS CHECK

Signature

Name